-- Fix trend_windows.id default: uuid_generate_v4() requires the uuid-ossp
-- extension which may not be loaded.  Switch to gen_random_uuid() which is
-- built-in to PostgreSQL 13+.
ALTER TABLE trend_windows ALTER COLUMN id SET DEFAULT gen_random_uuid();
